% Enlève les marges de 1 pouce.

\ProvidesPackage{lecon}[1996/11/11 (D.Monniaux et B.Allombert)]
\setlength{\voffset}{-1in}
\setlength{\hoffset}{-1in}
%\addtolength{\voffset}{.4cm}
%\addtolength{\hoffset}{.4cm}
\addtolength{\textwidth}{2in}
\addtolength{\textheight}{2in}
%\addtolength{\textwidth}{-.8cm}
%\addtolength{\textheight}{-.8cm}